/** 人员同步逻辑中设置为是，其他情况下为用户手动创建，应默认为否 **/

ALTER TABLE "xjr_department" ALTER COLUMN "is_sync" SET DEFAULT 'N';

ALTER TABLE "xjr_user_dept_relation" 
  ALTER COLUMN "is_sync" SET DEFAULT 'N',
  ALTER COLUMN "is_main" SET DEFAULT 'N';

ALTER TABLE "xjr_user" ALTER COLUMN "is_sync" SET DEFAULT 'N';