ALTER TABLE "xjr_workflow_schema" ALTER COLUMN "code" TYPE CHARACTER VARYING(
    150 char
);

ALTER TABLE "xjr_workflow_schema" ALTER COLUMN "name" TYPE CHARACTER VARYING(
    200 char
);

ALTER TABLE "xjr_workflow_schema_draft" ALTER COLUMN "code" TYPE CHARACTER VARYING(
    150 char
);

ALTER TABLE "xjr_workflow_schema_draft" ALTER COLUMN "name" TYPE CHARACTER VARYING(
    200 char
);