ALTER TABLE xjr_workflow_schema MODIFY COLUMN code VARCHAR(150);

ALTER TABLE xjr_workflow_schema MODIFY COLUMN name VARCHAR(200);

ALTER TABLE xjr_workflow_schema_draft MODIFY COLUMN code VARCHAR(150);

ALTER TABLE xjr_workflow_schema_draft MODIFY COLUMN name VARCHAR(200);