INSERT INTO xjr_system_config
(id, code, "name", value, remark, create_date, create_user_id, modify_date, modify_user_id, delete_mark, enabled_mark, tenant_id)
VALUES(1909523692669673474, 'checkErrorLoginCaptchaPriv', '登录验证码配置', '{"checkErrorLoginCaptcha":"Y","checkErrorLoginCaptchaCount":3}', '登录验证码开启配置，true 为打开，主要功能是如果checkErrorLoginCaptchaCount=0 每次登录都需要验证码。如果checkErrorLoginCaptchaCount>0 既失败多少次后需要验证码', '2025-04-08 16:28:20.249', 1000000000000000000, '2025-04-10 10:33:18.426', 1000000000000000000, 0, 1, NULL);
INSERT INTO xjr_system_config
(id, code, "name", value, remark, create_date, create_user_id, modify_date, modify_user_id, delete_mark, enabled_mark, tenant_id)
VALUES(1910134795422154754, 'checkErrorLoginBlockIpPriv', '登录错误开启ip拦截开关', '{"checkErrorLoginBlockIp":"N","checkErrorLoginBlockIpCount":20,"checkErrorLoginBlockIpRestoreTime":1}', '登录错误开启ip拦截开关checkErrorLoginBlockIp 配置Y为打开，N为关闭， checkErrorLoginBlockIpCount为最大次数， checkErrorLoginBlockIpRestoreTime为ip拦截的恢复时间（小时）使用', '2025-04-10 08:56:38.477', 1000000000000000000, '2025-04-10 14:51:58.972', 1000000000000000000, 0, 1, NULL);